X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/b2cf617cb8160a92696f1421675963aa00cb0c2b..bf7945cef10c0844a32e95695c544d829da9293a:/docs/latex/wx/tempfile.tex

diff --git a/docs/latex/wx/tempfile.tex b/docs/latex/wx/tempfile.tex
index bc21de6fcd..4fe80189c9 100644
--- a/docs/latex/wx/tempfile.tex
+++ b/docs/latex/wx/tempfile.tex
@@ -66,7 +66,7 @@ Associates wxTempFile with the file to be replaced and opens it. You should use
 \func{bool}{Open}{\param{const wxString\& }{strName}}
 
 Open the temporary file (strName is the name of file to be replaced), returns
-TRUE on success, FALSE if an error occured.
+TRUE on success, FALSE if an error occurred.
 
 \membersection{wxTempFile::IsOpened}\label{wxtempfileisopened}
 \constfunc{bool}{IsOpened}{\void}
