X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/b2cf617cb8160a92696f1421675963aa00cb0c2b..a84ece11fffdde5d1bbd254ba58ac3cee79c2e77:/docs/latex/wx/validatr.tex

diff --git a/docs/latex/wx/validatr.tex b/docs/latex/wx/validatr.tex
index fceeb76ed3..765c4d2084 100644
--- a/docs/latex/wx/validatr.tex
+++ b/docs/latex/wx/validatr.tex
@@ -53,7 +53,7 @@ Destructor.
 
 \membersection{wxValidator::Clone}\label{wxvalidatorclone}
 
-\constfunc{virtual wxValidator*}{Clone}{\void}
+\constfunc{virtual wxObject*}{Clone}{\void}
 
 All validator classes must implement the {\bf Clone} function, which returns
 an identical copy of itself. This is because validators are passed to control
