X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/b2cf617cb8160a92696f1421675963aa00cb0c2b..444cb676b239bd5d87c645c21c800053271cc348:/docs/latex/wx/function.tex

diff --git a/docs/latex/wx/function.tex b/docs/latex/wx/function.tex
index ddfd220486..3c6f375dd2 100644
--- a/docs/latex/wx/function.tex
+++ b/docs/latex/wx/function.tex
@@ -92,7 +92,6 @@ a directory.
 
 Returns time of last modification of given file.
 
-
 \membersection{::wxFileNameFromPath}
 
 \func{wxString}{wxFileNameFromPath}{\param{const wxString\& }{path}}
@@ -953,7 +952,7 @@ Sets the translation (from the top left corner) for PostScript output. The defau
 \section{Clipboard functions}\label{clipsboard}
 
 These clipboard functions are implemented for Windows only. The use of these functions
-is deprecated and the code is no longer maintained. Use the \helpref{wxClipboard}{wxclipboard}
+is deprecated and the code is no longer maintained. Use the \helpref{wxClipboard}{wxclipboard} 
 class instead.
 
 \wxheading{Include files}
@@ -1057,14 +1056,6 @@ The clipboard must have previously been opened for this call to succeed.
 
 \section{Miscellaneous functions}\label{miscellany}
 
-\membersection{wxHandleFatalExcetions}\label{wxhandlefatalexcetions}
-
-\func{bool}{wxHandleFatalExcetions}{\param{bool }{doIt = TRUE}}
-
-Enables or disables handling of fatal program exceptions. If {\it doIt} is
-TRUE, \helpref{wxApp::OnFatalException}{wxapponfatalexception} will be called
-before the program crashes. Otherwise, the default behaviour will be restored.
-
 \membersection{::wxNewId}
 
 \func{long}{wxNewId}{\void}
@@ -1186,7 +1177,7 @@ Gets the physical size of the display in pixels.
 
 \func{void}{wxEnableTopLevelWindow}{\param{bool}{ enable = TRUE}}
 
-This function enables or disables all top level windows. It is used by
+This function enables or disables all top level windows. It is used by 
 \helpref{::wxSafeYield}{wxsafeyield}.
 
 \wxheading{Include files}
@@ -1557,6 +1548,18 @@ Under Windows, this returns ``unknown''.
 
 <wx/utils.h>
 
+\membersection{::wxHandleFatalExceptions}\label{wxhandlefatalexceptions}
+
+\func{bool}{wxHandleFatalExceptions}{\param{bool}{ doIt = TRUE}}
+
+If {\it doIt} is TRUE, the fatal exceptions (also known as general protection
+faults under Windows or segmentation violations in the Unix world) will be
+caught and passed to \helpref{wxApp::OnFatalException}{wxapponfatalexception}.
+By default, i.e. before this function is called, they will be handled in the
+normal way which usually just means that the application will be terminated.
+Calling wxHandleFatalExceptions() with {\it doIt} equal to FALSE will restore
+this default behaviour.
+
 \membersection{::wxKill}\label{wxkill}
 
 \func{int}{wxKill}{\param{long}{ pid}, \param{int}{ sig}}
