X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/b253fb5cea219d563583fa8c26e71473f1c5c946..7f733b2674698b95755def1ad46651dc2a1eb4c2:/docs/latex/wx/listview.tex

diff --git a/docs/latex/wx/listview.tex b/docs/latex/wx/listview.tex
index e19a0b512b..c2d670bd1e 100644
--- a/docs/latex/wx/listview.tex
+++ b/docs/latex/wx/listview.tex
@@ -33,6 +33,10 @@ particular, it uses the same events, same window styles and so on.
 
 <wx/listctrl.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 %%%%%%%%%%%%% Methods in alphabetic order %%%%%%%%%%%%%
 \latexignore{\rtfignore{\wxheading{Members}}}
 
@@ -97,7 +101,7 @@ Returns the next selected item or $-1$ if there are no more of them.
 
 \membersection{wxListView::IsSelected}\label{wxlistviewisselected}
 
-\func{bool}{IsSelected}{\param{long }{index}}
+\constfunc{bool}{IsSelected}{\param{long }{index}}
 
 Returns {\tt true} if the item with the given {\it index} is selected, 
 {\tt false} otherwise.
