X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/b236c10f77e9ed0bc3c16d1cceb4a62f7048b4f9..c65650d7b5472d00da0a0516ff1a2ccf53746319:/docs/latex/wx/db.tex

diff --git a/docs/latex/wx/db.tex b/docs/latex/wx/db.tex
index de0f0fbee4..6b6de80bbe 100644
--- a/docs/latex/wx/db.tex
+++ b/docs/latex/wx/db.tex
@@ -319,7 +319,7 @@ This function is used to request a "new" wxDb instance for use by the program.
 The wxDb instance returned is also opened (see \helpref{wxDb::Open}{wxdbopen}).
 
 This function (along with wxDbFreeConnection() and wxDbCloseConnection())
-maintain a cached of wxDb instances for user/re-use by a program.  When a
+maintain a cache of wxDb instances for user/re-use by a program.  When a
 program needs a wxDb instance, it may call this function to obtain a wxDb
 instance.  If there is a wxDb instance in the cache that is currently unused
 that matches the connection requirements specified in {\it'pDbConfig'} then
