X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/b236c10f77e9ed0bc3c16d1cceb4a62f7048b4f9..4d8b1e479121b861bc99830d2ebca248bc162468:/docs/latex/wx/datistrm.tex?ds=inline

diff --git a/docs/latex/wx/datistrm.tex b/docs/latex/wx/datistrm.tex
index ae95da775e..4c30437f70 100644
--- a/docs/latex/wx/datistrm.tex
+++ b/docs/latex/wx/datistrm.tex
@@ -105,7 +105,7 @@ Reads a 32 bit unsigned integer from the stream.
 Reads 32 bit unsigned integers from the stream in a specified buffer. the amount of
 32 bit unsigned integer to read is specified by the {\it size} variable.
 
-\membersection{wxDataInputStream::Read64}\label{wxdatainputstreamread32}
+\membersection{wxDataInputStream::Read64}\label{wxdatainputstreamread64}
 
 \func{wxUint64}{Read64}{\void}
 
