X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/b236c10f77e9ed0bc3c16d1cceb4a62f7048b4f9..2cfbeac8141db28d9a022cdf92c12f82631a3c82:/docs/latex/wx/dialog.tex

diff --git a/docs/latex/wx/dialog.tex b/docs/latex/wx/dialog.tex
index cca1f238b8..ce76293cdf 100644
--- a/docs/latex/wx/dialog.tex
+++ b/docs/latex/wx/dialog.tex
@@ -55,7 +55,7 @@ below:
     }
 \end{verbatim}
 
-An application can define an \helpref{wxCloseEvent}{wxcloseevent} handler for
+An application can define a \helpref{wxCloseEvent}{wxcloseevent} handler for
 the dialog to respond to system close events.
 
 \wxheading{Window styles}
