X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/b236c10f77e9ed0bc3c16d1cceb4a62f7048b4f9..19f6bff4484b97ef036a793820eb30c0a6df92b5:/docs/latex/wx/datistrm.tex

diff --git a/docs/latex/wx/datistrm.tex b/docs/latex/wx/datistrm.tex
index ae95da775e..19fcc76465 100644
--- a/docs/latex/wx/datistrm.tex
+++ b/docs/latex/wx/datistrm.tex
@@ -43,7 +43,7 @@ None
 
 \func{}{wxDataInputStream}{\param{wxInputStream\&}{ stream}}
 
-\func{}{wxDataInputStream}{\param{wxInputStream\&}{ stream}, \param{wxMBConv\&}{ conv = wxMBConvUTF8}}
+\func{}{wxDataInputStream}{\param{wxInputStream\&}{ stream}, \param{const wxMBConv\&}{ conv = wxConvAuto()}}
 
 Constructs a datastream object from an input stream. Only read methods will
 be available. The second form is only available in Unicode build of wxWidgets.
@@ -105,7 +105,7 @@ Reads a 32 bit unsigned integer from the stream.
 Reads 32 bit unsigned integers from the stream in a specified buffer. the amount of
 32 bit unsigned integer to read is specified by the {\it size} variable.
 
-\membersection{wxDataInputStream::Read64}\label{wxdatainputstreamread32}
+\membersection{wxDataInputStream::Read64}\label{wxdatainputstreamread64}
 
 \func{wxUint64}{Read64}{\void}
 
