X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/b23386b266189c7e8561cdf3f6e25642b23c5ab8..d721baa9e64ff989a995faa3b8cfe93dbb2957ae:/docs/latex/wx/panel.tex?ds=sidebyside

diff --git a/docs/latex/wx/panel.tex b/docs/latex/wx/panel.tex
index ac46c67323..1b8f49e5cb 100644
--- a/docs/latex/wx/panel.tex
+++ b/docs/latex/wx/panel.tex
@@ -29,8 +29,6 @@ See also \helpref{window styles overview}{windowstyles}.
 
 By default, a panel has the same colouring as a dialog.
 
-A panel may be loaded from a wxWindows resource file (extension {\tt wxr}).
-
 \wxheading{See also}
 
 \helpref{wxDialog}{wxdialog}
@@ -43,7 +41,7 @@ A panel may be loaded from a wxWindows resource file (extension {\tt wxr}).
 
 Default constructor.
 
-\func{}{wxPanel}{\param{wxWindow* }{parent}, \param{wxWindowID }{id},\rtfsp
+\func{}{wxPanel}{\param{wxWindow* }{parent}, \param{wxWindowID }{id = $-1$},\rtfsp
 \param{const wxPoint\& }{pos = wxDefaultPosition},\rtfsp
 \param{const wxSize\& }{size = wxDefaultSize},\rtfsp
 \param{long}{ style = wxTAB\_TRAVERSAL},\rtfsp
@@ -58,10 +56,10 @@ Constructor.
 \docparam{id}{An identifier for the panel. A value of -1 is taken to mean a default.}
 
 \docparam{pos}{The panel position. A value of (-1, -1) indicates a default position, chosen by
-either the windowing system or wxWindows, depending on platform.}
+either the windowing system or wxWidgets, depending on platform.}
 
 \docparam{size}{The panel size. A value of (-1, -1) indicates a default size, chosen by
-either the windowing system or wxWindows, depending on platform.}
+either the windowing system or wxWidgets, depending on platform.}
 
 \docparam{style}{The window style. See \helpref{wxPanel}{wxpanel}.}
 
@@ -90,16 +88,23 @@ Destructor. Deletes any child windows before deleting the physical window.
 Used for two-step panel construction. See \helpref{wxPanel::wxPanel}{wxpanelconstr}\rtfsp
 for details.
 
+\membersection{wxPanel::GetDefaultItem}\label{wxpanelgetdefaultitem}
+
+\constfunc{wxButton*}{GetDefaultItem}{\void}
+
+Returns a pointer to the button which is the default for this window, or NULL.
+The default button is the one activated by pressing the Enter key.
+
 \membersection{wxPanel::InitDialog}\label{wxpanelinitdialog}
 
 \func{void}{InitDialog}{\void}
 
-Sends an \helpref{wxWindow::OnInitDialog}{wxwindowoninitdialog} event, which
+Sends a \helpref{wxInitDialogEvent}{wxinitdialogevent}, which
 in turn transfers data to the dialog via validators.
 
 \wxheading{See also}
 
-\helpref{wxWindow::OnInitDialog}{wxwindowoninitdialog}
+\helpref{wxInitDialogEvent}{wxinitdialogevent}
 
 \membersection{wxPanel::OnSysColourChanged}\label{wxpanelonsyscolourchanged}
 
@@ -116,11 +121,20 @@ The default handler for wxEVT\_SYS\_COLOUR\_CHANGED.
 Changes the panel's colour to conform to the current settings (Windows only).
 Add an event table entry for your panel class if you wish the behaviour
 to be different (such as keeping a user-defined
-background colour). If you do override this function, call \helpref{wxWindow::OnSysColourChanged}{wxwindowonsyscolourchanged} to
+background colour). If you do override this function, call wxEvent::Skip to
 propagate the notification to child windows and controls.
 
 \wxheading{See also}
 
 \helpref{wxSysColourChangedEvent}{wxsyscolourchangedevent}
 
+\membersection{wxPanel::SetDefaultItem}\label{wxpanelsetdefaultitem}
+
+\func{void}{SetDefaultItem}{\param{wxButton }{*btn}}
+
+Changes the default button for the panel.
+
+\wxheading{See also}
+
+\helpref{GetDefaultItem}{wxpanelgetdefaultitem}
 
