X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/b0a2d8a882a59d30d95a836b5897132de0262d91..801a492c49f0e4641046b4fbb3f2d18111b1b387:/docs/latex/wx/timer.tex

diff --git a/docs/latex/wx/timer.tex b/docs/latex/wx/timer.tex
index 7830183b5d..262e8332fc 100644
--- a/docs/latex/wx/timer.tex
+++ b/docs/latex/wx/timer.tex
@@ -20,6 +20,8 @@ In any case, you must start the timer with \helpref{Start}{wxtimerstart}
 after constructing it before it actually starts sending notifications. It can
 be stopped later with \helpref{Stop}{wxtimerstop}.
 
+{\bf NB:} note that timer can only be used from the main thread currently.
+
 \wxheading{Derived from}
 
 \helpref{wxObject}{wxobject}
