X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/afcc11bb931e5f8c5b41822fb04e598e02a0571c..6ab069f2b68cd266b31122d6a73a0878fd4760fe:/docs/latex/wx/sysopt.tex

diff --git a/docs/latex/wx/sysopt.tex b/docs/latex/wx/sysopt.tex
index 99a4d5129a..cd945711a4 100644
--- a/docs/latex/wx/sysopt.tex
+++ b/docs/latex/wx/sysopt.tex
@@ -42,6 +42,9 @@ used.}
 a window. You can also use the symbol wxMAC\_WINDOW\_PLAIN\_TRANSITION.}
 \twocolitem{window-default-variant}{The default variant used by windows (cast to integer from the wxWindowVariant enum).
 Also known as wxWINDOW\_DEFAULT\_VARIANT.}
+\twocolitem{mac.listctrl.always\_use\_generic}{Tells wxListCtrl to use the generic 
+control even when it is capable of using the native control instead. 
+Also knwon as wxMAC\_ALWAYS\_USE\_GENERIC\_LISTCTRL.}
 \end{twocollist}
 
 \wxheading{MGL}
