X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/af7e4f87c9c1d8c6b68f80da2b08b004e0dcdea4..c2651b0a5c407ceb1693a865ee19d3d57e147c97:/docs/latex/wx/display.tex

diff --git a/docs/latex/wx/display.tex b/docs/latex/wx/display.tex
index 15a9f51760..a7ff86db58 100644
--- a/docs/latex/wx/display.tex
+++ b/docs/latex/wx/display.tex
@@ -100,7 +100,7 @@ If the window is on more than one display it gets the display that overlaps the
 
 Returns -1 if the window is not on any connected display.
 
-Current windows only.
+Currently wxMSW only.
 
 \wxheading{Parameters}
 
