X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/af266e5bf7e064ba818c1b1619325eb8c5b874f7..d2b23b67301bd2d286366d4326a21da3132558fa:/docs/latex/wx/module.tex

diff --git a/docs/latex/wx/module.tex b/docs/latex/wx/module.tex
index 795746352d..754a5e039e 100644
--- a/docs/latex/wx/module.tex
+++ b/docs/latex/wx/module.tex
@@ -101,3 +101,4 @@ Provide this function with appropriate cleanup for your module.
 
 Provide this function with appropriate initialization for your module. If the function
 returns false, wxWidgets will exit immediately.
+
