X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/abfff787c7b3aab163eca068db55b74f4b3e6111..488e150743b031df1f388205faebba62c1048d7a:/docs/latex/wx/manual.tex

diff --git a/docs/latex/wx/manual.tex b/docs/latex/wx/manual.tex
index 1a56a298ae..636ca3d800 100644
--- a/docs/latex/wx/manual.tex
+++ b/docs/latex/wx/manual.tex
@@ -632,7 +632,7 @@ You should have received a copy of the GNU Library General Public
 License along with this library; if not, write to the Free
 Software Foundation, Inc., 675 Mass Ave, Cambridge, MA 02139, USA.
 \end{verbatim}
-}
+}%
 
 Also add information on how to contact you by electronic and paper mail.
 
@@ -648,7 +648,7 @@ library `Frob' (a library for tweaking knobs) written by James Random Hacker.
 <signature of Ty Coon>, 1 April 1990
 Ty Coon, President of Vice
 \end{verbatim} 
-}
+}%
 
 That's all there is to it!
 
