X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/ababa106ae015f05e14cd2487100954ef50ca694..419237157d2f750f629e24ac97ede6afb01e921f:/docs/latex/wx/panel.tex?ds=inline

diff --git a/docs/latex/wx/panel.tex b/docs/latex/wx/panel.tex
index 355cc31ca4..f175de0f13 100644
--- a/docs/latex/wx/panel.tex
+++ b/docs/latex/wx/panel.tex
@@ -90,7 +90,7 @@ for details.
 
 \membersection{wxPanel::GetDefaultItem}\label{wxpanelgetdefaultitem}
 
-\constfunc{wxButton*}{GetDefaultItem}{\void}
+\constfunc{wxWindow*}{GetDefaultItem}{\void}
 
 Returns a pointer to the button which is the default for this window, or NULL.
 The default button is the one activated by pressing the Enter key.
