X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/ab2469043f2cb803720c4000dd93d3494bf3ef46..2006289b741f13c3d0a89f3758777850135f10e1:/docs/latex/wx/stdevtid.tex

diff --git a/docs/latex/wx/stdevtid.tex b/docs/latex/wx/stdevtid.tex
index 679ff5b976..b186b9f3c3 100644
--- a/docs/latex/wx/stdevtid.tex
+++ b/docs/latex/wx/stdevtid.tex
@@ -1,18 +1,19 @@
 \section{Standard event identifiers}\label{stdevtid}
 
-wxWindows defines a special identifier value {\tt wxID\_ANY} which is used in
+wxWidgets defines a special identifier value {\tt wxID\_ANY} which is used in
 the following two situations:
+
 \begin{itemize}
-    \item when creating a new window you may specify {\tt wxID\_ANY} to let
-          wxWindows assign an unused identifier to it automatically
-    \item when installing an event handler using either the event table
-          macros or \helpref{wxEvtHandler::Connect}{wxevthandlerconnect}
-          you may use it to indicate that you want to handle the events
-          coming from any control, regardless of its identifier
+\item when creating a new window you may specify {\tt wxID\_ANY} to let
+wxWidgets assign an unused identifier to it automatically
+\item when installing an event handler using either the event table
+macros or \helpref{wxEvtHandler::Connect}{wxevthandlerconnect},
+you may use it to indicate that you want to handle the events
+coming from any control, regardless of its identifier
 \end{itemize}
 
-wxWindows also defines a few standard command identifiers which may be used by
-the user code and also are sometimes used by wxWindows itself. These reserved
+wxWidgets also defines a few standard command identifiers which may be used by
+the user code and also are sometimes used by wxWidgets itself. These reserved
 identifiers are all in the range between {\tt wxID\_LOWEST} and 
 {\tt wxID\_HIGHEST} and, accordingly, the user code should avoid defining its
 own constants in this range.
