X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/aad65f130d9cb77d0e9f2b7b580c54712386f77a..1e4709b3305ca02671c86932b2bcf74afb33b54d:/docs/latex/wx/app.tex

diff --git a/docs/latex/wx/app.tex b/docs/latex/wx/app.tex
index f082563254..080164f33c 100644
--- a/docs/latex/wx/app.tex
+++ b/docs/latex/wx/app.tex
@@ -137,7 +137,8 @@ otherwise.
 
 \wxheading{See also}
 
-\helpref{wxApp::SetExitOnFrameDelete}{wxappsetexitonframedelete}
+\helpref{wxApp::SetExitOnFrameDelete}{wxappsetexitonframedelete},\\
+\helpref{wxApp shutdown overview}{wxappshutdownoverview}
 
 \membersection{wxApp::GetTopWindow}\label{wxappgettopwindow}
 
@@ -265,8 +266,10 @@ was used}
 
 \func{int}{OnExit}{\void}
 
-Provide this member function for any processing which needs to be done as
-the application is about to exit.
+Provide this member function for any processing which needs to be
+done as the application is about to exit. OnExit is called after
+destroying all application windows and controls, but before
+wxWindows cleanup.
 
 \membersection{wxApp::OnCmdLineError}\label{wxapponcmdlineerror}
 
@@ -550,6 +553,11 @@ top-level frame is deleted.
 \docparam{flag}{If TRUE (the default), the application will exit when the top-level frame is
 deleted. If FALSE, the application will continue to run.}
 
+\wxheading{See also}
+
+\helpref{wxApp::GetExitOnFrameDelete}{wxappgetexitonframedelete},\\
+\helpref{wxApp shutdown overview}{wxappshutdownoverview}
+
 \membersection{wxApp::SetTopWindow}\label{wxappsettopwindow}
 
 \func{void}{SetTopWindow}{\param{wxWindow* }{window}}
