X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/aad035b2f51cc206edc0b888695dfb5c8d53687a..a75124d0da255513e83d2e62f963dd849829466b:/docs/latex/wx/platinfo.tex

diff --git a/docs/latex/wx/platinfo.tex b/docs/latex/wx/platinfo.tex
index 315aa6ca4c..e44d4d1a66 100644
--- a/docs/latex/wx/platinfo.tex
+++ b/docs/latex/wx/platinfo.tex
@@ -22,6 +22,10 @@ is running under and some basic architecture info of the machine where it's runn
 
 <wx/platinfo.h>
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 \wxheading{See also}
 
 \helpref{wxGetOSVersion}{wxgetosversion}, \helpref{wxIsPlatformLittleEndian}{wxisplatformlittleendian},
@@ -373,6 +377,7 @@ Returns the run-time minor version of the toolkit associated with this wxPlatfor
 Note that if \helpref{GetPortId}{wxplatforminfogetportid} returns wxPORT\_BASE, then this value is zero (unless externally modified with \helpref{SetToolkitVersion}{wxplatforminfosettoolkitversion}); that is, no native toolkit is in use.
 
 See \helpref{wxAppTraits::GetToolkitVersion}{wxapptraitsgettoolkitversion} for more info.
+
 \wxheading{See also}
 
 \helpref{CheckToolkitVersion}{wxplatforminfochecktoolkitversion}
