X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/aa61d3525370a9b9fa8c797d9b7f89d96994db5f..21f47fb900438b3e517184eace6b82ab74c2c474:/docs/latex/wx/checklst.tex

diff --git a/docs/latex/wx/checklst.tex b/docs/latex/wx/checklst.tex
index 8098222dc6..dae20cfdd2 100644
--- a/docs/latex/wx/checklst.tex
+++ b/docs/latex/wx/checklst.tex
@@ -23,6 +23,7 @@ and therefore this is not available to the application.
 \wxheading{Derived from}
 
 \helpref{wxListBox}{wxlistbox}\\
+\helpref{wxControlWithItems}{wxcontrolwithitems}\\
 \helpref{wxControl}{wxcontrol}\\
 \helpref{wxWindow}{wxwindow}\\
 \helpref{wxEvtHandler}{wxevthandler}\\
@@ -32,6 +33,10 @@ and therefore this is not available to the application.
 
 <wx/checklst.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{Window styles}
 
 See \helpref{wxListBox}{wxlistbox}.
