X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/a99acbb00a102458b8ad5ba4459712ba73d8b14d..47610ec22ab01dbc09307a88ab67c1c95f6ee3b1:/docs/latex/wx/datostrm.tex?ds=sidebyside

diff --git a/docs/latex/wx/datostrm.tex b/docs/latex/wx/datostrm.tex
index 5e5dd04781..53616ac33d 100644
--- a/docs/latex/wx/datostrm.tex
+++ b/docs/latex/wx/datostrm.tex
@@ -64,13 +64,19 @@ Writes the single byte {\it i8} to the stream.
 
 \func{void}{Write16}{{\param wxUint16 }{i16}}
 
-Writes the 16 bit integer {\it i16} to the stream.
+Writes the 16 bit unsigned integer {\it i16} to the stream.
 
 \membersection{wxDataOutputStream::Write32}
 
 \func{void}{Write32}{{\param wxUint32 }{i32}}
 
-Writes the 32 bit integer {\it i32} to the stream.
+Writes the 32 bit unsigned integer {\it i32} to the stream.
+
+\membersection{wxDataOutputStream::Write64}
+
+\func{void}{Write64}{{\param wxUint64 }{i64}}
+
+Writes the 64 bit unsigned integer {\it i64} to the stream.
 
 \membersection{wxDataOutputStream::WriteDouble}
 
@@ -82,7 +88,6 @@ Writes the double {\it f} to the stream using the IEEE format.
 
 \func{void}{WriteString}{{\param const wxString\&}{string}}
 
-
 Writes {\it string} to the stream. Actually, this method writes the size of
 the string before writing {\it string} itself.
 
@@ -92,3 +97,4 @@ is first converted to multibyte representation with {\it conv} object passed
 to stream's constructor (consequently, ANSI application can read data 
 written by Unicode application, as long as they agree on encoding) and this
 representation is written to the stream. UTF-8 is used by default.
+
