X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/a98f98ac6f4422f259fc3324975156f7554adf41..aad65f130d9cb77d0e9f2b7b580c54712386f77a:/docs/latex/wx/postscpt.tex

diff --git a/docs/latex/wx/postscpt.tex b/docs/latex/wx/postscpt.tex
index 68ef4d111f..c901a61772 100644
--- a/docs/latex/wx/postscpt.tex
+++ b/docs/latex/wx/postscpt.tex
@@ -27,7 +27,7 @@ Constructor. {\it output} is an optional file for printing to, and if
 various parameters. {\it parent} is the parent of the printer dialog box.
 
 Use the {\it Ok} member to test whether the constructor was successful
-in creating a useable device context.
+in creating a usable device context.
 
 See \helpref{Printer settings}{printersettings} for functions to set and
 get PostScript printing settings.
