X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/a98f98ac6f4422f259fc3324975156f7554adf41..a61c9122413cef45bad87da7e3dc65617bb2adb7:/docs/latex/wx/postscpt.tex?ds=sidebyside

diff --git a/docs/latex/wx/postscpt.tex b/docs/latex/wx/postscpt.tex
index 68ef4d111f..4bdb15f767 100644
--- a/docs/latex/wx/postscpt.tex
+++ b/docs/latex/wx/postscpt.tex
@@ -1,6 +1,6 @@
 \section{\class{wxPostScriptDC}}\label{wxpostscriptdc}
 
-This defines the wxWindows Encapsulated PostScript device context,
+This defines the wxWidgets Encapsulated PostScript device context,
 which can write PostScript files on any platform. See \helpref{wxDC}{wxdc} for
 descriptions of the member functions.
 
@@ -13,21 +13,23 @@ descriptions of the member functions.
 
 <wx/dcps.h>
 
-\membersection{wxPostScriptDC::wxPostScriptDC}
+\latexignore{\rtfignore{\wxheading{Members}}}
+
+\membersection{wxPostScriptDC::wxPostScriptDC}\label{wxpostscriptdcctor}
 
 \func{}{wxPostScriptDC}{\param{const wxPrintData\&}{ printData}}
 
 Constructs a PostScript printer device context from a \helpref{wxPrintData}{wxprintdata} object.
 
-\func{}{wxPostScriptDC}{\param{const wxString\& }{output}, \param{bool }{interactive = TRUE},\\
+\func{}{wxPostScriptDC}{\param{const wxString\& }{output}, \param{bool }{interactive = true},\\
   \param{wxWindow *}{parent}}
 
 Constructor. {\it output} is an optional file for printing to, and if
-\rtfsp{\it interactive} is TRUE a dialog box will be displayed for adjusting
+\rtfsp{\it interactive} is true a dialog box will be displayed for adjusting
 various parameters. {\it parent} is the parent of the printer dialog box.
 
 Use the {\it Ok} member to test whether the constructor was successful
-in creating a useable device context.
+in creating a usable device context.
 
 See \helpref{Printer settings}{printersettings} for functions to set and
 get PostScript printing settings.
