X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/a95a6eb4aae5bf15be0eef80d0247595cf3874b3..2cd78b2a875c3b7abd8a9f1025e164124fae0088:/docs/latex/wx/sysopt.tex

diff --git a/docs/latex/wx/sysopt.tex b/docs/latex/wx/sysopt.tex
index 12b8b11bf8..91009e1a7c 100644
--- a/docs/latex/wx/sysopt.tex
+++ b/docs/latex/wx/sysopt.tex
@@ -44,6 +44,8 @@ level windows is currently supported, however this may sometimes fail and this
 option allows to override the automatic detection. Setting it to $1$ makes the
 transparency be always available (setting it can still fail, of course) and
 setting it to $0$ makes it always unavailable.}
+\twocolitem{gtk.desktop}{This option can be set to override the default desktop
+environment determination. Supported values are \texttt{GNOME} and \texttt{KDE}.}
 \end{twocollist}
 
 \wxheading{Mac}
