X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/a91225b27b4416488d299ef10053bb822e6a9bf4..dc484d491b15355285a89da275c58c2ef247d1f4:/docs/latex/wx/pen.tex

diff --git a/docs/latex/wx/pen.tex b/docs/latex/wx/pen.tex
index 8f39b78099..e4353792b5 100644
--- a/docs/latex/wx/pen.tex
+++ b/docs/latex/wx/pen.tex
@@ -154,12 +154,10 @@ is found in the colour database.
 \func{}{\destruct{wxPen}}{\void}
 
 Destructor.
+See \helpref{reference-counted object destruction}{refcountdestruct} for more info.
 
 \wxheading{Remarks}
 
-The destructor may not delete the underlying pen object of the native windowing
-system, since wxBrush uses a reference counting system for efficiency.
-
 Although all remaining pens are deleted when the application exits,
 the application should try to clean up all pens itself. This is because
 wxWidgets cannot know if a pointer to the pen object is stored in an
@@ -335,17 +333,15 @@ Assignment operator, using \helpref{reference counting}{trefcount}.
 
 \func{bool}{operator $==$}{\param{const wxPen\& }{pen}}
 
-Equality operator. Two pens are equal if they contain pointers
-to the same underlying pen data. It does not compare each attribute,
-so two independently-created pens using the same parameters will
-fail the test.
+Equality operator.
+See \helpref{reference-counted object comparison}{refcountequality} for more info.
 
 \membersection{wxPen::operator $!=$}\label{wxpennotequals}
 
 \func{bool}{operator $!=$}{\param{const wxPen\& }{pen}}
 
-Inequality operator. Two pens are not equal if they contain pointers
-to different underlying pen data. It does not compare each attribute.
+Inequality operator.
+See \helpref{reference-counted object comparison}{refcountequality} for more info.
 
 \section{\class{wxPenList}}\label{wxpenlist}
 
