X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/a9102b3671a45d116d781b0c8e90d2e9a84fbdcb..c944775f72435d2c0493113e05445898ab8baf1b:/docs/latex/wx/frame.tex

diff --git a/docs/latex/wx/frame.tex b/docs/latex/wx/frame.tex
index 3f3bd4fa10..b7e00593e3 100644
--- a/docs/latex/wx/frame.tex
+++ b/docs/latex/wx/frame.tex
@@ -21,6 +21,10 @@ application windows.
 
 <wx/frame.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{Window styles}
 
 \twocolwidtha{5cm}
@@ -34,7 +38,7 @@ application windows.
 \twocolitem{\windowstyle{wxMAXIMIZE\_BOX}}{Displays a maximize box on the frame.}
 \twocolitem{\windowstyle{wxCLOSE\_BOX}}{Displays a close box on the frame.}
 \twocolitem{\windowstyle{wxSTAY\_ON\_TOP}}{Stay on top of all other windows,
-see also wxFRAME\_FLOAT\_ON\_PARENT. Windows only.}
+see also wxFRAME\_FLOAT\_ON\_PARENT.}
 \twocolitem{\windowstyle{wxSYSTEM\_MENU}}{Displays a system menu.}
 \twocolitem{\windowstyle{wxRESIZE\_BORDER}}{Displays a resizeable border around the window.}
 \twocolitem{\windowstyle{wxFRAME\_TOOL\_WINDOW}}{Causes a frame with a small
@@ -191,7 +195,7 @@ wxWidgets.}
 
 \wxheading{Return value}
 
-A pointer to the the status bar if it was created successfully, NULL otherwise.
+A pointer to the status bar if it was created successfully, NULL otherwise.
 
 \wxheading{Remarks}
 
@@ -211,7 +215,7 @@ Note that you can put controls and other windows on the status bar if you wish.
 
 \membersection{wxFrame::CreateToolBar}\label{wxframecreatetoolbar}
 
-\func{virtual wxToolBar*}{CreateToolBar}{\param{long}{ style = wxNO\_BORDER \pipe wxTB\_HORIZONTAL},
+\func{virtual wxToolBar*}{CreateToolBar}{\param{long}{ style = wxBORDER\_NONE \pipe wxTB\_HORIZONTAL},
  \param{wxWindowID}{ id = -1}, \param{const wxString\&}{ name = "toolBar"}}
 
 Creates a toolbar at the top or left of the frame.
@@ -228,7 +232,7 @@ wxWidgets.}
 
 \wxheading{Return value}
 
-A pointer to the the toolbar if it was created successfully, NULL otherwise.
+A pointer to the toolbar if it was created successfully, NULL otherwise.
 
 \wxheading{Remarks}
 
@@ -488,7 +492,7 @@ Sets the widths of the fields in the status bar.
 
 \wxheading{Parameters}
 
-\wxheading{n}{The number of fields in the status bar. It must be the
+\docparam{n}{The number of fields in the status bar. It must be the
 same used in \helpref{CreateStatusBar}{wxframecreatestatusbar}.}
 
 \docparam{widths}{Must contain an array of {\it n} integers, each of which is a status field width
