X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/a9102b3671a45d116d781b0c8e90d2e9a84fbdcb..40717c90bf265de0a752d637a35cd88cb22bbd05:/docs/latex/wx/frame.tex?ds=sidebyside

diff --git a/docs/latex/wx/frame.tex b/docs/latex/wx/frame.tex
index 3f3bd4fa10..bd81c1fa61 100644
--- a/docs/latex/wx/frame.tex
+++ b/docs/latex/wx/frame.tex
@@ -191,7 +191,7 @@ wxWidgets.}
 
 \wxheading{Return value}
 
-A pointer to the the status bar if it was created successfully, NULL otherwise.
+A pointer to the status bar if it was created successfully, NULL otherwise.
 
 \wxheading{Remarks}
 
@@ -228,7 +228,7 @@ wxWidgets.}
 
 \wxheading{Return value}
 
-A pointer to the the toolbar if it was created successfully, NULL otherwise.
+A pointer to the toolbar if it was created successfully, NULL otherwise.
 
 \wxheading{Remarks}
 
