X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/a9102b3671a45d116d781b0c8e90d2e9a84fbdcb..304b9d52cf2a01372ed0e83bd062812ad7d77c78:/docs/latex/wx/toolbar.tex

diff --git a/docs/latex/wx/toolbar.tex b/docs/latex/wx/toolbar.tex
index c6d63f58ff..feaf156332 100644
--- a/docs/latex/wx/toolbar.tex
+++ b/docs/latex/wx/toolbar.tex
@@ -8,10 +8,6 @@ The name wxToolBar is defined to be a synonym for one of the following classes:
 \item {\bf wxToolBarGTK} The GTK toolbar.
 \end{itemize}
 
-Note that the base class {\bf wxToolBarBase} defines
-automatic scrolling management functionality which is similar
-to \helpref{wxScrolledWindow}{wxscrolledwindow}, so please refer to this class also.
-
 \wxheading{Derived from}
 
 wxToolBarBase\\
@@ -214,13 +210,11 @@ toggled) or wxITEM\_RADIO for a checkable tool which makes part of a radio
 group of tools each of which is automatically unchecked whenever another button
 in the group is checked}
 
-\docparam{bitmap1}{The primary tool bitmap for toggle and button tools.}
+\docparam{bitmap1}{The primary tool bitmap.}
 
-\docparam{bitmap2}{The second bitmap specifies the on-state bitmap for a toggle
-tool. If this is wxNullBitmap, either an inverted version of the primary bitmap is
-used for the on-state of a toggle tool (monochrome displays) or a black
-border is drawn around the tool (colour displays) or the pixmap is shown
-as a pressed button (GTK). }
+\docparam{bitmap2}{The bitmap used when the tool is disabled. If it is equal to
+wxNullBitmap, the disabled bitmap is automatically generated by greing the
+normal one.}
 
 \docparam{shortHelpString}{This string is used for the tools tooltip}
 
