X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/a8d08dbd459c1b7be9c1d82d9a78a32ae2730d86..85d8df29aa7c2de9ea92d13adeff46d5ed854d58:/docs/latex/wx/arrstrng.tex

diff --git a/docs/latex/wx/arrstrng.tex b/docs/latex/wx/arrstrng.tex
index e6a7484de2..6d53707dc5 100644
--- a/docs/latex/wx/arrstrng.tex
+++ b/docs/latex/wx/arrstrng.tex
@@ -195,7 +195,7 @@ could break the order of items and, for example, subsequent calls to
 
 \membersection{wxArrayString::IsEmpty}\label{wxarraystringisempty}
 
-\func{}{IsEmpty}{}
+\func{bool}{IsEmpty}{}
 
 Returns true if the array is empty, false otherwise. This function returns the
 same result as {\it GetCount() == 0} but is probably easier to read.
@@ -213,7 +213,7 @@ version.
 
 \membersection{wxArrayString::Last}\label{wxarraystringlast}
 
-\func{}{Last}{}
+\func{wxString&}{Last}{}
 
 Returns the last element of the array. Attempt to access the last element of
 an empty array will result in assert failure in debug build, however no checks
