X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/a8d08dbd459c1b7be9c1d82d9a78a32ae2730d86..3200f37d25e1e0fae6c054e773701a73318657fd:/docs/latex/wx/array.tex?ds=sidebyside

diff --git a/docs/latex/wx/array.tex b/docs/latex/wx/array.tex
index a3da99e682..3e806ad938 100644
--- a/docs/latex/wx/array.tex
+++ b/docs/latex/wx/array.tex
@@ -633,7 +633,7 @@ elements of a wxArray (supposed to contain pointers).
 \func{void}{SetCount}{\param{size\_t }{count}, \param{T }{defval = T($0$)}}
 
 This function ensures that the number of array elements is at least 
-{\it count}. If the array has already {\it count} or mroe items, nothing is
+{\it count}. If the array has already {\it count} or more items, nothing is
 done. Otherwise, {\tt count - GetCount()} elements are added and initialized to
 the value {\it defval}.
 
