X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/a84e46f23169fc203099c23643219d1a8b562b50..329eeca9c404b5e670af89cf7d2b1e517aa71853:/docs/latex/wx/inputstr.tex?ds=inline

diff --git a/docs/latex/wx/inputstr.tex b/docs/latex/wx/inputstr.tex
index 05f45a1884..eb2c5f2249 100644
--- a/docs/latex/wx/inputstr.tex
+++ b/docs/latex/wx/inputstr.tex
@@ -49,8 +49,11 @@ Returns true if the end of stream has been reached.
 
 \wxheading{Note}
 
-This cannot be really implemented for all streams and CanRead() is more 
-reliable than Eof().
+For some streams Eof() will not return true until an
+attempt has been made to read past the end of the stream.
+\helpref{LastRead()}{wxinputstreamlastread}
+should be called after each read to check that
+a non-zero number of bytes have been read.
 
 \membersection{wxInputStream::LastRead}\label{wxinputstreamlastread}
 
