X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/a82c22998b76c7109366e8aea5e1fc90154ce749..d3f00f59938d4801a95afa1cd638b8f15c481ee3:/docs/latex/wx/stackwalker.tex?ds=sidebyside

diff --git a/docs/latex/wx/stackwalker.tex b/docs/latex/wx/stackwalker.tex
index 562e80eb76..90f7eb5c12 100644
--- a/docs/latex/wx/stackwalker.tex
+++ b/docs/latex/wx/stackwalker.tex
@@ -46,6 +46,10 @@ No base class
 
 <wx/stackwalk.h>
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 Only available if \texttt{wxUSE\_STACKWALKER} is $1$, currently only
 implemented for Win32 and Unix versions using recent version of GNU libc.
 
@@ -94,9 +98,11 @@ Up to \arg{maxDepth} frames are walked from the innermost to the outermost one.
 
 \membersection{wxStackWalker::WalkFromException}\label{wxstackwalkerwalkfromexception}
 
-\func{void}{WalkFromException}{\void}
+\func{void}{WalkFromException}{\param{size\_t }{maxDepth = 200}}
 
 Enumerate stack frames from the location of uncaught exception.
 This method can only be called from
 \helpref{wxApp::OnFatalException()}{wxapponfatalexception}.
 
+Up to \arg{maxDepth} frames are walked from the innermost to the outermost one.
+
