X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/a7d34a619bcc79ef30f70d7636a6f4be4b30c354..a0c2e4a050f4f2e8d344483ba4cfaa8b08a1fe87:/docs/latex/wx/mbcnvfil.tex

diff --git a/docs/latex/wx/mbcnvfil.tex b/docs/latex/wx/mbcnvfil.tex
index f394797bbb..fc3f3d8388 100644
--- a/docs/latex/wx/mbcnvfil.tex
+++ b/docs/latex/wx/mbcnvfil.tex
@@ -1,24 +1,19 @@
-%
-% automatically generated by HelpGen from
-% ../include/wx/strconv.h at 25/Mar/00 10:20:56
-%
-
 \section{\class{wxMBConvFile}}\label{wxmbconvfile}
 
-This class used to be used for defining the class instance
+This class used to define the class instance 
 {\bf wxConvFileName}, but nowadays {\bf wxConvFileName} is
 either of type wxConvLibc (on most platforms) or wxConvUTF8
 (on MacOS X). {\bf wxConvFileName} converts filenames between 
 filesystem multibyte encoding and Unicode. {\bf wxConvFileName} 
 can also be set to a something else at run-time which is used 
 e.g. by wxGTK to use a class which checks the environment 
-variable {\bf G_FILESYSTEM_ENCODING} indicating that filenames 
+variable {\bf G\_FILESYSTEM\_ENCODING} indicating that filenames 
 should not be interpreted as UTF8 and also for converting 
-invalid UTF8 characters (e.g. if there is a filename in iso8859_1)
+invalid UTF8 characters (e.g. if there is a filename in iso8859\_1)
 to strings with octal values. 
 
-Since some platforms (e.g. Win32) use Unicode in the filenames,
-and others (e.g. Unix) use multibyte encodings, this class should only
+Since some platforms (such as Win32) use Unicode in the filenames,
+and others (such as Unix) use multibyte encodings, this class should only
 be used directly if wxMBFILES is defined to 1. A convenience macro,
 wxFNCONV, is defined to wxConvFileName->cWX2MB in this case. You could
 use it like this:
