X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/a7af285d1ab87e908454bfabbbe063ab1756912b..c699b4583b6047191ac326728654c6fe8920aa7b:/docs/latex/wx/settings.tex

diff --git a/docs/latex/wx/settings.tex b/docs/latex/wx/settings.tex
index 0b5435c258..4a66fa7fac 100644
--- a/docs/latex/wx/settings.tex
+++ b/docs/latex/wx/settings.tex
@@ -122,6 +122,8 @@ metric as possible (e.g a wxTopLevelWindow in case of the wxSYS\_CAPTION\_Y metr
 clicks must fall to generate a double-click.}
 \twocolitem{{\bf wxSYS\_DCLICK\_Y}}{Height in pixels of rectangle within which two successive mouse
 clicks must fall to generate a double-click.}
+\twocolitem{{\bf wxSYS\_DCLICK\_MSEC}}{Maximal time, in milliseconds, which may
+pass between subsequent clicks for a double click to be generated.}
 \twocolitem{{\bf wxSYS\_DRAG\_X}}{Width in pixels of a rectangle centered on a drag point
 to allow for limited movement of the mouse pointer before a drag operation begins.}
 \twocolitem{{\bf wxSYS\_DRAG\_Y}}{Height in pixels of a rectangle centered on a drag point
