X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/a7af285d1ab87e908454bfabbbe063ab1756912b..c266eff98c5e44012647f54f38a1e29ecabd8759:/docs/latex/wx/checklst.tex

diff --git a/docs/latex/wx/checklst.tex b/docs/latex/wx/checklst.tex
index 59935be3c1..dae20cfdd2 100644
--- a/docs/latex/wx/checklst.tex
+++ b/docs/latex/wx/checklst.tex
@@ -23,6 +23,7 @@ and therefore this is not available to the application.
 \wxheading{Derived from}
 
 \helpref{wxListBox}{wxlistbox}\\
+\helpref{wxControlWithItems}{wxcontrolwithitems}\\
 \helpref{wxControl}{wxcontrol}\\
 \helpref{wxWindow}{wxwindow}\\
 \helpref{wxEvtHandler}{wxevthandler}\\
