X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/a7af285d1ab87e908454bfabbbe063ab1756912b..9eac91c4324d02646925fc60bcd8e68d096a1659:/docs/latex/wx/log.tex

diff --git a/docs/latex/wx/log.tex b/docs/latex/wx/log.tex
index 037eaed107..7a606ef27c 100644
--- a/docs/latex/wx/log.tex
+++ b/docs/latex/wx/log.tex
@@ -610,7 +610,8 @@ don't want this to happen, use wxLogInterposerTemp instead.
 
 \wxheading{Derived from}
 
-\helpref{wxLogChain}{wxlogchain}
+\helpref{wxLogChain}{wxlogchain}\\
+\helpref{wxLog}{wxlog}
 
 \wxheading{Include files}
 
@@ -640,7 +641,8 @@ and/or \helpref{DoLogString}{wxlogdologstring} methods.
 
 \wxheading{Derived from}
 
-\helpref{wxLogChain}{wxlogchain}
+\helpref{wxLogChain}{wxlogchain}\\
+\helpref{wxLog}{wxlog}
 
 \wxheading{Include files}
 
@@ -766,7 +768,9 @@ them normally by showing the standard log dialog.
 
 \wxheading{Derived from}
 
-\helpref{wxLogInterposer}{wxloginterposer}
+\helpref{wxLogInterposer}{wxloginterposer}\\
+\helpref{wxLogChain}{wxlogchain}\\
+\helpref{wxLog}{wxlog}
 
 \wxheading{Include files}
 
