X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/a7af285d1ab87e908454bfabbbe063ab1756912b..85136e3bf5dadf921652519e71da5db351fb3194:/docs/latex/wx/semaphor.tex

diff --git a/docs/latex/wx/semaphor.tex b/docs/latex/wx/semaphor.tex
index ebf41109ad..9d9271f944 100644
--- a/docs/latex/wx/semaphor.tex
+++ b/docs/latex/wx/semaphor.tex
@@ -47,8 +47,9 @@ No base class
 \func{}{wxSemaphore}{\param{int }{initialcount = 0}, \param{int }{maxcount = 0}}
 
 Specifying a {\it maxcount} of $0$ actually makes wxSemaphore behave as if
-there is no upper limit. If maxcount is $1$, the semaphore behaves exactly as a
-mutex.
+there is no upper limit. If maxcount is $1$, the semaphore behaves almost as a
+mutex (but unlike a mutex it can be released by a thread different from the one
+which acquired it).
 
 {\it initialcount} is the initial value of the semaphore which must be between
 $0$ and {\it maxcount} (if it is not set to $0$).
