X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/a7af285d1ab87e908454bfabbbe063ab1756912b..6d0f32ddb8e1aec3b8707db31ed244758c242672:/docs/latex/wx/dynlib.tex?ds=sidebyside

diff --git a/docs/latex/wx/dynlib.tex b/docs/latex/wx/dynlib.tex
index 8c15876b0c..967416a24c 100644
--- a/docs/latex/wx/dynlib.tex
+++ b/docs/latex/wx/dynlib.tex
@@ -167,6 +167,8 @@ be a combination of the following bits:
 \twocolitem{wxDL\_VERBATIM}{don't try to append the appropriate extension to
 the library name (this is done by default).}
 \twocolitem{wxDL\_DEFAULT}{default flags, same as wxDL\_NOW currently}
+\twocolitem{wxDL\_QUIET}{don't log an error message if the library couldn't be
+loaded.}
 \end{twocollist}
 
 Returns \true if the library was successfully loaded, \false otherwise.
