X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/a7af285d1ab87e908454bfabbbe063ab1756912b..3b96ea1ac54b735c3a018980cd2ac652c30aa129:/docs/latex/wx/conditn.tex?ds=sidebyside

diff --git a/docs/latex/wx/conditn.tex b/docs/latex/wx/conditn.tex
index cf3a6df608..84510e7ee4 100644
--- a/docs/latex/wx/conditn.tex
+++ b/docs/latex/wx/conditn.tex
@@ -44,8 +44,8 @@ public:
         // tell the other(s) thread(s) that we're about to terminate: we must
         // lock the mutex first or we might signal the condition before the
         // waiting threads start waiting on it!
-        wxMutexLocker lock(m_mutex);
-        m_condition.Broadcast(); // same as Signal() here -- one waiter only
+        wxMutexLocker lock(*m_mutex);
+        m_condition->Broadcast(); // same as Signal() here -- one waiter only
 
         return 0;
     }
