X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/a7af285d1ab87e908454bfabbbe063ab1756912b..2712e31795ee7ab4de62189b440d702f3f849c0d:/docs/latex/wx/httag.tex

diff --git a/docs/latex/wx/httag.tex b/docs/latex/wx/httag.tex
index 70e6bb48c7..2ed4d07300 100644
--- a/docs/latex/wx/httag.tex
+++ b/docs/latex/wx/httag.tex
@@ -94,7 +94,7 @@ and name of {\tt </table>} is "TABLE")
 
 \membersection{wxHtmlTag::GetParam}\label{wxhtmltaggetparam}
 
-\constfunc{wxString}{GetParam}{\param{const wxString\& }{par}, \param{bool }{with\_commas = false}}
+\constfunc{wxString}{GetParam}{\param{const wxString\& }{par}, \param{bool }{with\_quotes = false}}
 
 Returns the value of the parameter. You should check whether the
 parameter exists or not (use \helpref{HasParam}{wxhtmltaghasparam}) first.
@@ -103,7 +103,7 @@ parameter exists or not (use \helpref{HasParam}{wxhtmltaghasparam}) first.
 
 \docparam{par}{The parameter's name.}
 
-\docparam{with\_commas}{true if you want to get commas as well. See example.}
+\docparam{with\_quotes}{true if you want to get quotes as well. See example.}
 
 \wxheading{Example}
 
