X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/a7af285d1ab87e908454bfabbbe063ab1756912b..245b9db51823e59bd61f0d7c0c69b419495cf0b7:/docs/latex/wx/stattext.tex

diff --git a/docs/latex/wx/stattext.tex b/docs/latex/wx/stattext.tex
index 188ed07ce9..00be03aa2c 100644
--- a/docs/latex/wx/stattext.tex
+++ b/docs/latex/wx/stattext.tex
@@ -106,12 +106,15 @@ label text is needed.
 
 \membersection{wxStaticText::GetLabelText}\label{wxstatictextgetlabeltext}
 
-\constfunc{const wxString\&}{GetLabelText}{\void}
+\constfunc{wxString}{GetLabelText}{\void}
 
-Returns the control's label or the given \arg{label} string for the static
-version without the mnemonics characters (if any) and without the markup
-(if the control has \texttt{wxST\_MARKUP} style).
+\func{static wxString}{GetLabelText}{\param{const wxString\& }{label}}
 
+The first form returns the control's label without the mnemonics characters (if any) 
+and without the markup (if the control has \texttt{wxST\_MARKUP} style).
+
+The second (static) version returns the given \arg{label} string without the mnemonics 
+characters (if any) and without the markup.
 
 
 \membersection{wxStaticText::SetLabel}\label{wxstatictextsetlabel}
