X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/a7af285d1ab87e908454bfabbbe063ab1756912b..07fa8f78f82cd01ef4034a489419da9e86499b18:/docs/latex/wx/minifram.tex

diff --git a/docs/latex/wx/minifram.tex b/docs/latex/wx/minifram.tex
index 9b384cd516..94be6ca012 100644
--- a/docs/latex/wx/minifram.tex
+++ b/docs/latex/wx/minifram.tex
@@ -3,9 +3,13 @@
 A miniframe is a frame with a small title bar. It is suitable for floating toolbars that must not
 take up too much screen area.
 
+An example of mini frame can be seen in the \helpref{dialogs sample}{sampledialogs} 
+using the ``Mini frame'' command of the ``Generic dialogs'' submenu.
+
 \wxheading{Derived from}
 
 \helpref{wxFrame}{wxframe}\\
+\helpref{wxTopLevelWindow}{wxtoplevelwindow}\\
 \helpref{wxWindow}{wxwindow}\\
 \helpref{wxEvtHandler}{wxevthandler}\\
 \helpref{wxObject}{wxobject}
