X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/a71d815bbe669ebb9bdb9409926a272c37a5a9aa..103791a6d0c32bdba98238b9d6abb8f8e2f80183:/docs/latex/wx/cppconst.tex

diff --git a/docs/latex/wx/cppconst.tex b/docs/latex/wx/cppconst.tex
index c573457828..1a70ebe593 100644
--- a/docs/latex/wx/cppconst.tex
+++ b/docs/latex/wx/cppconst.tex
@@ -181,6 +181,6 @@ monolithic wxWidgets library, defined as $0$ when building GUI library only)}
 exceptions has been switched off}
 \twocolitem{wxNO\_THREADS}{if this macro is defined, the compilation options
 don't include compiler flags needed for multithreaded code generation. This
-implies that wxUSE\_THREADS is $0$ and also that other (non wx-based) threading
+implies that wxUSE\_THREADS is $0$ and also that other (non-wx-based) threading
 packages cannot be used neither.}
 \end{twocollist}
