X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/a70b2f8001a5522cf6f172f11ba36b4af65af121..751731864888f00e31e6dce1092ac28a1fac5358:/docs/latex/wx/sizer.tex

diff --git a/docs/latex/wx/sizer.tex b/docs/latex/wx/sizer.tex
index bc285bd529..7ab64a666f 100644
--- a/docs/latex/wx/sizer.tex
+++ b/docs/latex/wx/sizer.tex
@@ -111,13 +111,13 @@ dependent on the specific kind of sizer used.
 the space assigned to the item.}
 \twocolitem{\windowstyle{wxSHAPED}}{The item will be expanded as much
 as possible while also maintaining its aspect ratio}
-\twocolitem{\windowstyle{wxFIXED\_MINSIZE}}{Normally wxSizers will use
-  \helpref{GetAdjustedBestSize}{wxwindowgetadjustedbestsize} to
-  determin what the minimal size of window items should be, and will
-  use that size to calculate the layout.  This allows layouts to
-  adjust when an item changes and it's {\it best size} becomes
-  different.  If you would rather have a window item stay the size it
-  started with then use wxFIXED\_MINSIZE.}
+\twocolitem{\windowstyle{wxFIXED\_MINSIZE}}{Normally wxSizers will use 
+\helpref{GetAdjustedBestSize}{wxwindowgetadjustedbestsize} to
+determine what the minimal size of window items should be, and will
+use that size to calculate the layout. This allows layouts to
+adjust when an item changes and its {\it best size} becomes
+different. If you would rather have a window item stay the size it
+started with then use wxFIXED\_MINSIZE.}
 \twocolitem{\windowstyle{wxALIGN\_CENTER}\\
 \windowstyle{wxALIGN\_LEFT}\\
 \windowstyle{wxALIGN\_RIGHT}\\
@@ -125,8 +125,8 @@ as possible while also maintaining its aspect ratio}
 \windowstyle{wxALIGN\_BOTTOM}\\
 \windowstyle{wxALIGN\_CENTER\_VERTICAL}\\
 \windowstyle{wxALIGN\_CENTER\_HORIZONTAL}}{The wxALIGN flags allow you to
-  specify the alignment of the item within the space allotted to it by
-  the sizer, ajusted for the border if any.}
+specify the alignment of the item within the space allotted to it by
+the sizer, adjusted for the border if any.}
 \end{twocollist}
 }
 
