X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/a66abda9d31bd568152769cc7fa594ef168f8aca..a9249b2eb2a40d8c71f828669045c4ddaa8dc5ff:/docs/latex/wx/print.tex?ds=sidebyside

diff --git a/docs/latex/wx/print.tex b/docs/latex/wx/print.tex
index c2eb9f3114..b498836b50 100644
--- a/docs/latex/wx/print.tex
+++ b/docs/latex/wx/print.tex
@@ -760,6 +760,10 @@ it should be designed to take no parameters (other than the self
 reference) and to return a tuple of four integers.
 }
 
+\perlnote{When this method is overridden in a derived class,
+it must not take any parameters, an return a 4-element list.
+}
+
 \membersection{wxPrintout::GetPageSizeMM}\label{wxprintoutgetpagesizemm}
 
 \func{void}{GetPageSizeMM}{\param{int *}{w}, \param{int *}{h}}
@@ -768,6 +772,9 @@ Returns the size of the printer page in millimetres.
 
 \pythonnote{This method returns the output-only parameters as a tuple.}
 
+\perlnote{In wxPerl this method takes no arguments and returns a
+2-element list {\tt ( w, h )}}
+
 \membersection{wxPrintout::GetPageSizePixels}\label{wxprintoutgetpagesizepixels}
 
 \func{void}{GetPageSizePixels}{\param{int *}{w}, \param{int *}{h}}
@@ -781,6 +788,9 @@ previewing is to be supported.
 
 \pythonnote{This method returns the output-only parameters as a tuple.}
 
+\perlnote{In wxPerl this method takes no arguments and returns a
+2-element list {\tt ( w, h )}}
+
 \membersection{wxPrintout::GetPPIPrinter}\label{wxprintoutgetppiprinter}
 
 \func{void}{GetPPIPrinter}{\param{int *}{w}, \param{int *}{h}}
@@ -792,6 +802,9 @@ this by a scaling factor to take the preview DC size into account.
 
 \pythonnote{This method returns the output-only parameters as a tuple.}
 
+\perlnote{In wxPerl this method takes no arguments and returns a
+2-element list {\tt ( w, h )}}
+
 \membersection{wxPrintout::GetPPIScreen}\label{wxprintoutgetppiscreen}
 
 \func{void}{GetPPIScreen}{\param{int *}{w}, \param{int *}{h}}
@@ -803,6 +816,9 @@ this by a scaling factor to take the preview DC size into account.
 
 \pythonnote{This method returns the output-only parameters as a tuple.}
 
+\perlnote{In wxPerl this method takes no arguments and returns a
+2-element list {\tt ( w, h )}}
+
 \membersection{wxPrintout::HasPage}\label{wxprintouthaspage}
 
 \func{bool}{HasPage}{\param{int}{ pageNum}}
@@ -830,7 +846,7 @@ checked) from within the overridden function, since it calls wxDC::StartDoc.
 
 \pythonnote{If this method is overridden in a Python class then the
 base class version can be called by using the method
-{\tt base_OnBeginDocument(startPage, endPage)}. }
+{\tt base\_OnBeginDocument(startPage, endPage)}. }
 
 \membersection{wxPrintout::OnEndDocument}\label{wxprintoutonenddocument}
 
