X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/a660d684eda27638bca0384b2058911a31c8e845..f811bc9ac07404a8e90570b243918d11289ef1e2:/docs/latex/wx/postscpt.tex

diff --git a/docs/latex/wx/postscpt.tex b/docs/latex/wx/postscpt.tex
index e654c282d8..c901a61772 100644
--- a/docs/latex/wx/postscpt.tex
+++ b/docs/latex/wx/postscpt.tex
@@ -9,8 +9,16 @@ descriptions of the member functions.
 \helpref{wxDC}{wxdc}\\
 \helpref{wxObject}{wxobject}
 
+\wxheading{Include files}
+
+<wx/dcps.h>
+
 \membersection{wxPostScriptDC::wxPostScriptDC}
 
+\func{}{wxPostScriptDC}{\param{const wxPrintData\&}{ printData}}
+
+Constructs a PostScript printer device context from a \helpref{wxPrintData}{wxprintdata} object.
+
 \func{}{wxPostScriptDC}{\param{const wxString\& }{output}, \param{bool }{interactive = TRUE},\\
   \param{wxWindow *}{parent}}
 
@@ -19,16 +27,26 @@ Constructor. {\it output} is an optional file for printing to, and if
 various parameters. {\it parent} is the parent of the printer dialog box.
 
 Use the {\it Ok} member to test whether the constructor was successful
-in creating a useable device context.
+in creating a usable device context.
 
 See \helpref{Printer settings}{printersettings} for functions to set and
 get PostScript printing settings.
 
-\membersection{wxPostScriptDC::GetStream}
+This constructor and the global printer settings are now deprecated;
+use the wxPrintData constructor instead.
+
+
+\membersection{wxPostScriptDC::SetResolution}\label{wxpostscriptdcsetresolution}
+
+\func{static void}{SetResolution}{\param{int}{ ppi}}
+
+Set resolution (in pixels per inch) that will be used in PostScript
+output. Default is 720ppi.
 
-\func{ostream *}{GetStream}{\void}
+\membersection{wxPostScriptDC::GetResolution}\label{wxpostscriptdcgetresolution}
 
-Returns the stream currently being used to write PostScript output. Use this
-to insert any PostScript code that is outside the scope of wxPostScriptDC.
+\func{static int}{GetResolution}{\void}
 
+Return resolution used in PostScript output. See 
+\helpref{SetResolution}{wxpostscriptdcsetresolution}.
 
