X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/a660d684eda27638bca0384b2058911a31c8e845..f6ed38239c20927281363f3828323e05b4917c0e:/docs/latex/wx/database.tex?ds=inline

diff --git a/docs/latex/wx/database.tex b/docs/latex/wx/database.tex
index cf155b86ca..2f860c64d1 100644
--- a/docs/latex/wx/database.tex
+++ b/docs/latex/wx/database.tex
@@ -1,15 +1,26 @@
 \section{\class{wxDatabase}}\label{wxdatabase}
 
-Every database object represents an ODBC connection. The connection may be closed and reopened.
+Every database object represents an ODBC connection.
+The connection may be closed and reopened.
 
-\wxheading{Derivation}
+\wxheading{Derived from}
 
 \helpref{wxObject}{wxobject}
 
+\wxheading{Include files}
+
+<wx/odbc.h>
+
 \wxheading{See also}
 
 \overview{wxDatabase overview}{wxdatabaseoverview}, \helpref{wxRecordSet}{wxrecordset}
 
+A much more robust and feature-rich set of ODBC classes is now
+available and recommended for use in place of the wxDatabase class.
+
+See details of these classes in:
+\helpref{wxDb}{wxdb}, \helpref{wxDbTable}{wxdbtable}
+
 \latexignore{\rtfignore{\wxheading{Members}}}
 
 \membersection{wxDatabase::wxDatabase}
@@ -91,7 +102,7 @@ Returns the name of the database associated with the current connection.
 \func{wxString}{GetDataSource}{\void}
 
 Returns the name of the connected data source.
-  
+
 \membersection{wxDatabase::GetErrorClass}
 
 \func{wxString}{GetErrorClass}{\void}
@@ -141,7 +152,7 @@ Returns the current ODBC database handle.
 \func{HENV}{GetHENV}{\void}
 
 Returns the ODBC environment handle. 
-  
+
 \membersection{wxDatabase::GetInfo}
 
 \func{bool}{GetInfo}{\param{long}{ infoType}, \param{long *}{buf}}
@@ -219,7 +230,7 @@ source. The parameters exclusive and readOnly are not used.
 \func{void}{OnSetOptions}{\param{wxRecordSet *}{recordSet}}
 
 Not implemented.  
-  
+
 \membersection{wxDatabase::OnWaitForDataSource}
 
 \func{void}{OnWaitForDataSource}{\param{bool}{ stillExecuting}}
@@ -237,13 +248,13 @@ Sends a rollback to the ODBC driver. Not implemented.
 \func{void}{SetDataSource}{\param{const wxString\& }{s}}
 
 Sets the name of the data source. Not implemented.
-  
+
 \membersection{wxDatabase::SetLoginTimeout}
 
 \func{void}{SetLoginTimeout}{\param{long}{ seconds}}
 
 Sets the time to wait for an user login. Not implemented.
-  
+
 \membersection{wxDatabase::SetPassword}
 
 \func{void}{SetPassword}{\param{const wxString\& }{s}}
@@ -262,7 +273,7 @@ mode is supported, so this function has no effect.
 \func{void}{SetQueryTimeout}{\param{long}{ seconds}}
 
 Sets the time to wait for a response to a query. Not implemented.
- 
+
 \membersection{wxDatabase::SetUsername}
 
 \func{void}{SetUsername}{\param{const wxString\& }{s}}
