X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/a660d684eda27638bca0384b2058911a31c8e845..e602002e27b29b261848ffea89472befceca0ccb:/docs/latex/wx/validatr.tex

diff --git a/docs/latex/wx/validatr.tex b/docs/latex/wx/validatr.tex
index c5c13bf4d2..b6319b0a39 100644
--- a/docs/latex/wx/validatr.tex
+++ b/docs/latex/wx/validatr.tex
@@ -23,6 +23,10 @@ For more information, please see \helpref{Validator overview}{validatoroverview}
 \helpref{wxEvtHandler}{wxevthandler}\\
 \helpref{wxObject}{wxobject}
 
+\wxheading{Include files}
+
+<wx/validate.h>
+
 \wxheading{See also}
 
 \helpref{Validator overview}{validatoroverview}, \helpref{wxTextValidator}{wxtextvalidator}
@@ -60,6 +64,13 @@ This base function returns NULL.
 
 Returns the window associated with the validator.
 
+\membersection{wxValidator::SetBellOnError}{wxvalidatorsetbellonerror}
+
+\func{void}{SetBellOnError}{\param{bool}{ doIt = TRUE}}
+
+This functions switches on or turns off the error sound produced by the
+validators if an invalid key is pressed.
+
 \membersection{wxValidator::SetWindow}\label{wxvalidatorsetwindow}
 
 \func{void}{SetWindow}{\param{wxWindow*}{ window}}
