X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/a660d684eda27638bca0384b2058911a31c8e845..a84ece11fffdde5d1bbd254ba58ac3cee79c2e77:/docs/latex/wx/tapp.tex?ds=sidebyside

diff --git a/docs/latex/wx/tapp.tex b/docs/latex/wx/tapp.tex
index c5e0322a72..f9f7ef4026 100644
--- a/docs/latex/wx/tapp.tex
+++ b/docs/latex/wx/tapp.tex
@@ -18,7 +18,7 @@ An application closes by destroying all windows. Because all frames must
 be destroyed for the application to exit, it is advisable to use parent
 frames wherever possible when creating new frames, so that deleting the
 top level frame will automatically delete child frames. The alternative
-is to explicitly delete child frames in the top-level frame's \helpref{wxWindow::OnCloseWindow}{wxwindowonclosewindow}\rtfsp
+is to explicitly delete child frames in the top-level frame's \helpref{wxCloseEvent}{wxcloseevent}\rtfsp
 handler.
 
 In emergencies the \helpref{wxExit}{wxexit} function can be called to kill the
@@ -27,15 +27,15 @@ application.
 An example of defining an application follows:
 
 \begin{verbatim}
-class DerivedApp: public wxApp
+class DerivedApp : public wxApp
 {
- public:
-  bool OnInit(void);
+public:
+  virtual bool OnInit();
 };
 
 IMPLEMENT_APP(DerivedApp)
 
-bool DerivedApp::OnInit(void)
+bool DerivedApp::OnInit()
 {
   wxFrame *the_frame = new wxFrame(NULL, argv[0]);
   ...
