X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/a660d684eda27638bca0384b2058911a31c8e845..96db102a93ed103a1c757c4445dd71789c2d0054:/docs/latex/wx/gauge.tex

diff --git a/docs/latex/wx/gauge.tex b/docs/latex/wx/gauge.tex
index 6f87385815..a6b2336e9f 100644
--- a/docs/latex/wx/gauge.tex
+++ b/docs/latex/wx/gauge.tex
@@ -10,6 +10,10 @@ There are no user commands for the gauge.
 \helpref{wxEvtHandler}{wxEvtHandler}\\
 \helpref{wxObject}{wxobject}
 
+\wxheading{Include files}
+
+<wx/gauge.h>
+
 \wxheading{Window styles}
 
 \twocolwidtha{5cm}
@@ -21,6 +25,10 @@ There are no user commands for the gauge.
 
 See also \helpref{window styles overview}{windowstyles}.
 
+\wxheading{Event handling}
+
+wxGauge is read-only so generates no events.
+
 \wxheading{See also}
 
 \helpref{wxSlider}{wxslider}, \helpref{wxScrollBar}{wxscrollbar}
@@ -33,9 +41,9 @@ See also \helpref{window styles overview}{windowstyles}.
 
 Default constructor.
 
-\func{}{wxGauge}{\param{wxWindow* }{parent}, \param{const wxWindowID }{id},\rtfsp
-\param{const int}{ range}, \param{const wxPoint\& }{ pos = wxDefaultPosition}, \param{const wxSize\&}{ size = wxDefaultSize},\rtfsp
-\param{const long}{ style = wxGA\_HORIZONTAL}, \param{const wxValidator\& }{validator = wxDefaultValidator}, \param{const wxString\& }{name = ``gauge"}}
+\func{}{wxGauge}{\param{wxWindow* }{parent}, \param{wxWindowID }{id},\rtfsp
+\param{int}{ range}, \param{const wxPoint\& }{ pos = wxDefaultPosition}, \param{const wxSize\&}{ size = wxDefaultSize},\rtfsp
+\param{long}{ style = wxGA\_HORIZONTAL}, \param{const wxValidator\& }{validator = wxDefaultValidator}, \param{const wxString\& }{name = ``gauge"}}
 
 Constructor, creating and showing a gauge.
 
@@ -72,9 +80,9 @@ Destructor, destroying the gauge.
 
 \membersection{wxGauge::Create}\label{wxgaugecreate}
 
-\func{bool}{Create}{\param{wxWindow* }{parent}, \param{const wxWindowID }{id},\rtfsp
-\param{const int}{ range}, \param{const wxPoint\& }{ pos = wxDefaultPosition}, \param{const wxSize\&}{ size = wxDefaultSize},\rtfsp
-\param{const long}{ style = wxGA\_HORIZONTAL}, \param{const wxValidator\& }{validator = wxDefaultValidator}, \param{const wxString\& }{name = ``gauge"}}
+\func{bool}{Create}{\param{wxWindow* }{parent}, \param{wxWindowID }{id},\rtfsp
+\param{int}{ range}, \param{const wxPoint\& }{ pos = wxDefaultPosition}, \param{const wxSize\&}{ size = wxDefaultSize},\rtfsp
+\param{long}{ style = wxGA\_HORIZONTAL}, \param{const wxValidator\& }{validator = wxDefaultValidator}, \param{const wxString\& }{name = ``gauge"}}
 
 Creates the gauge for two-step construction. See \helpref{wxGauge::wxGauge}{wxgaugeconstr}\rtfsp
 for further details.
@@ -129,7 +137,7 @@ Returns the current position of the gauge.
 
 \membersection{wxGauge::SetBezelFace}\label{wxgaugesetbezelface}
 
-\func{void}{SetBezelFace}{\param{const int }{width}}
+\func{void}{SetBezelFace}{\param{int }{width}}
 
 Sets the 3D bezel face width.
 
@@ -143,7 +151,7 @@ Windows only, not for {\bf wxGA\_PROGRESSBAR}.
 
 \membersection{wxGauge::SetRange}\label{wxgaugesetrange}
 
-\func{void}{SetRange}{\param{const int }{range}}
+\func{void}{SetRange}{\param{int }{range}}
 
 Sets the range (maximum value) of the gauge.
 
@@ -153,7 +161,7 @@ Sets the range (maximum value) of the gauge.
 
 \membersection{wxGauge::SetShadowWidth}\label{wxgaugesetshadowwidth}
 
-\func{void}{SetShadowWidth}{\param{const int }{width}}
+\func{void}{SetShadowWidth}{\param{int }{width}}
 
 Sets the 3D shadow width.
 
@@ -163,7 +171,7 @@ Windows only, not for {\bf wxGA\_PROGRESSBAR}.
 
 \membersection{wxGauge::SetValue}\label{wxgaugesetvalue}
 
-\func{void}{SetValue}{\param{const int }{pos}}
+\func{void}{SetValue}{\param{int }{pos}}
 
 Sets the position of the gauge.
 
