X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/a660d684eda27638bca0384b2058911a31c8e845..8dba8632c5bcd64724e2e9e2d40e295555a0cb86:/docs/latex/wx/imaglist.tex

diff --git a/docs/latex/wx/imaglist.tex b/docs/latex/wx/imaglist.tex
index 87eea4dea7..548b3dae78 100644
--- a/docs/latex/wx/imaglist.tex
+++ b/docs/latex/wx/imaglist.tex
@@ -12,6 +12,10 @@ wxImageList is used principally in conjunction with \helpref{wxTreeCtrl}{wxtreec
 
 \helpref{wxObject}{wxobject}
 
+\wxheading{Include files}
+
+<wx/imaglist.h>
+
 \wxheading{See also}
 
 \helpref{wxTreeCtrl}{wxtreectrl}, \helpref{wxListCtrl}{wxlistctrl}
@@ -24,8 +28,8 @@ wxImageList is used principally in conjunction with \helpref{wxTreeCtrl}{wxtreec
 
 Default constructor.
 
-\func{}{wxImageList}{\param{const int }{width}, \param{const int }{height}, \param{const bool }{mask = TRUE},\rtfsp
-\param{const int }{initialCount = 1}}
+\func{}{wxImageList}{\param{int }{width}, \param{int }{height}, \param{const bool }{mask = TRUE},\rtfsp
+\param{int }{initialCount = 1}}
 
 Constructor specifying the image size, whether image masks should be created, and the initial size of the list.
 
@@ -53,7 +57,7 @@ Adds a new image using a bitmap and optional mask bitmap.
 
 Adds a new image using a bitmap and mask colour.
 
-\func{int}{Add}{\param{const wxBitmap\&}{ icon}}
+\func{int}{Add}{\param{const wxIcon\&}{ icon}}
 
 Adds a new image using an icon.
 
@@ -75,17 +79,25 @@ The new zero-based image index.
 
 The original bitmap or icon is not affected by the {\bf Add} operation, and can be deleted afterwards.
 
+\pythonnote{In place of a single overloaded method name, wxPython
+implements the following methods:\par
+\indented{2cm}{\begin{twocollist}
+\twocolitem{{\bf Add(bitmap, mask=wxNullBitmap)}}{}
+\twocolitem{{\bf AddWithColourMask(bitmap, colour)}}{}
+\twocolitem{{\bf AddIcon(icon)}}{}
+\end{twocollist}}
+}
 \membersection{wxImageList::Create}\label{wximagelistcreate}
 
-\func{bool}{Create}{\param{const int }{width}, \param{const int }{height}, \param{const bool }{mask = TRUE},\rtfsp
-\param{const int }{initialCount = 1}}
+\func{bool}{Create}{\param{int }{width}, \param{int }{height}, \param{const bool }{mask = TRUE},\rtfsp
+\param{int }{initialCount = 1}}
 
 Initializes the list. See \helpref{wxImageList::wxImageList}{wximagelistconstr} for details.
 
 \membersection{wxImageList::Draw}\label{wximagelistdraw}
 
-\func{bool}{Draw}{\param{const int}{ index}, \param{wxDC\&}{ dc}, \param{const int }{x},\rtfsp
-\param{const int }{x}, \param{const int }{flags = wxIMAGELIST\_DRAW\_NORMAL},\rtfsp
+\func{bool}{Draw}{\param{int}{ index}, \param{wxDC\&}{ dc}, \param{int }{x},\rtfsp
+\param{int }{x}, \param{int }{flags = wxIMAGELIST\_DRAW\_NORMAL},\rtfsp
 \param{const bool }{solidBackground = FALSE}}
 
 Draws a specified image onto a device context.
@@ -119,9 +131,29 @@ that the background is solid.}
 
 Returns the number of images in the list.
 
+\membersection{wxImageList::GetSize}\label{wximagelistgetsize}
+
+\constfunc{bool}{GetSize}{\param{int }{index}, \param{int\& }{width}, \param{int \&}{height}}
+
+Retrieves the size of the images in the list. Currently, the {\it index} 
+parameter is ignored as all images in the list have the same size.
+
+\wxheading{Parameters}
+
+\docparam{index}{currently unused, should be 0}
+
+\docparam{width}{receives the width of the images in the list}
+
+\docparam{height}{receives the height of the images in the list}
+
+\wxheading{Return value}
+
+TRUE if the function succeeded, FALSE if it failed (for example, if the image
+list was not yet initialized).
+
 \membersection{wxImageList::Remove}\label{wximagelistremove}
 
-\func{bool}{Remove}{\param{const int}{ index}}
+\func{bool}{Remove}{\param{int}{ index}}
 
 Removes the image at the given position.
 
@@ -133,11 +165,11 @@ Removes all the images in the list.
 
 \membersection{wxImageList::Replace}\label{wximagelistreplace}
 
-\func{bool}{Replace}{\param{const int}{ index}, \param{const wxBitmap\&}{ bitmap}, \param{const wxBitmap\&}{ mask = wxNullBitmap}}
+\func{bool}{Replace}{\param{int}{ index}, \param{const wxBitmap\&}{ bitmap}, \param{const wxBitmap\&}{ mask = wxNullBitmap}}
 
 Replaces the existing image with the new image.
 
-\func{bool}{Replace}{\param{const int}{ index}, \param{const wxIcon\&}{ icon}}
+\func{bool}{Replace}{\param{int}{ index}, \param{const wxIcon\&}{ icon}}
 
 Replaces the existing image with the new image.
 
@@ -157,4 +189,6 @@ TRUE if the replacement was successful, FALSE otherwise.
 
 The original bitmap or icon is not affected by the {\bf Replace} operation, and can be deleted afterwards.
 
+\pythonnote{The second form is called {\tt ReplaceIcon} in wxPython.}
+
 
